スクリンプロテクトプログラム

 スクリンプロテクトプログラムの起動

 機能設定説明


スクリンプロテクトプログラムの起動

[コントロ－ルセンタ]の[表示器]の機能に進入してから、下図のの通り[スクリンプロテクト]の項目を押してから:

矢印の所を押して、[ScrSav]ファイルを選択してください｡


機能設定説明

ここで選びたい方式と内容を設定します。スクリンプロテクトプログラムの設定機能に進入してから、次の様な画面を表示します:

背景の図形

背景格式:

ピュア－カラ－:単一カラ－の背景です｡

映像ファイル:すきな映像ファイルを選択して背景とします｡

オリジナルの壁紙:オリジナルの壁紙て背景として選択します｡

展示方式:

違った展示方式を選択します｡

速度:表示の速度です｡

筆跡

速度:表示の速度です｡

ビュ－: ファイルを選択します｡

新増／編集筆跡ファイル

新しいスクリンプロテクトプログラム筆跡ファイルまた旧いスクリンプロテクトプログラム筆跡ファイルを直します｡

形成:新しい筆跡ファイルを形成します｡

編集:旧い筆跡ファイルを直します｡

ファイルオプション

旧いファイルの起動:旧いスクリンプロテクトプログラム筆跡ファイルを起動します｡

ファイルのセ－ブ:編集したスクリンプロテクトプログラム筆跡ファイルをセ－ブします｡

表示オプション

格線:画板に格線のベ－スラインを表示します｡

背景のカラ－:画板の背景のカラ－を変更します｡

画面クリア:画板の筆跡をクリアします｡

フルスクリン筆跡をフルスクリンにエンラ－ジします

システム

時間の再現: 筆跡図形の間隔時間を再現します｡

スクリンプロテクタ－の起動: スクリンプロテクタ－を起動またクロ－ズします｡


* :速度、筆跡を表示する速度の速さを調整します。この値が大きいければ大｡@｡@

きいほど速くなります｡

*スペ－ス:筆跡をスクリンに表示する時のスペ－スを設定します｡

フルスクリンにエンラ－ジする: 筆跡を最大にエンラ－ジします｡